en	TYPO3 Online Documentation

en	No modules have been registered. Please contact your system administrator.

en	Show references

en	System Information

en	This is a short system overview. For advanced information please head to:

en	Environment Module

en	Your system is fully operational. Have a nice day.

en	Recently switched to

en	Switch to user %s

en	Logo: If set, this logo will be used instead of the TYPO3 logo above the login credential fields (e.g. fileadmin/images/login-logo.png or EXT:my_theme/Resources/Public/Images/login-logo.png or //domain.tld/login-logo.png).

en	Logo Alt-Text: If a custom logo is set, this text will be used as the alt attribute of the img tag.

en	Highlight Color: If set, this color will be used as highlight color in the login screen.

en	Background Image: If set, this image will be used as background image for the login screen (e.g. fileadmin/images/my-background.jpg or EXT:my_theme/Resources/Public/Images/my-background.jpg or //domain.tld/my-background.png).

en	Footnote: If set, this text will be displayed on the login screen to provide copyright information for the background image (e.g. background image © 2017 by John Doe) or a descriptive text.

en	Logo: If set, this logo will be used instead of the TYPO3 logo in the TYPO3 backend in the left top corner (e.g. fileadmin/images/backend-logo.png or EXT:my_theme/Resources/Public/Images/backend-logo.png).

en	Favicon: If set, this favicon will be used instead of the TYPO3 logo (e.g. EXT:my_theme/Resources/Public/Images/favicon.ico).

en	No folders available

en	You do not have access to any folder. Please ask your administrator to fix access permissions for your account.

en	Login

en	Footnote

en	Login with username and password

en	Username

en	Password

en	Toggle password visibility

en	Forgot your password?

en	Attention: Caps lock enabled!

en	Caps lock enabled

en	System News

en	Date

en	Previous

en	Next

en	Login Provider

en	Further information about TYPO3

en	Your login attempt did not succeed

en	Make sure to spell your username and password correctly, including upper/lowercase characters.

en	Please activate JavaScript!

en	Please activate Cookies!

en	TYPO3 relies on HTTP referrers for security reasons in the backend. It seems your browser refused to send this information.

en	Verifying Login Data ...

en	Login

en	More about TYPO3

en	TYPO3 logo

en	Donate

en	The record with uid %2$s from table %1$s could not be retrieved from the database. This data inconsistency can occur if a base record has been deleted but the intermediate record from table %3$s with uid %4$s still points to it. To fix this situation, either delete the intermediate record, or recover the deleted record using the recycler module.

en	Module Menu

en	Page cache

en	Successfully cleared page cache

en	Page cache could not be cleared

en	[title missing]

en	Create new folder

en	Your new folder name

en	Create folder

en	The live pendant of this record will be deleted when this workspace record is published.

en	%s%s on page "%s" [%d]

en	Database records

en	Database record

en	Pages

en	Page