en	LinkValidator

en	Introduction

en	Check links for validity

en	Overview of links on website

en	Overview - choose options to check the links

en	Total amounts in tt_content

en	Records with ext. links

en	External links

en	Amounts from actual branch in tt_content

en	Records with ext. links

en	External links

en	Attention

en	Checking links may take up to several minutes. Checking ONE link can last up to 3 seconds.

en	Report

en	Check Links

en	Show these types of broken links

en	Check these types of broken links

en	Show this level

en	Check this level

en	Broken links total

en	Internal Links

en	File Links

en	External Links

en	Refresh display

en	Check links

en	Listing of broken links

en	Path

en	Element

en	Link

en	URL / Link Target

en	Error message

en	Last check

en	Edit element containing this broken link

en	(Field: %s)

en	no headline

en	Page '###title###' (###uid###) is deleted.

en	Page '###title###' (###uid###) is not visible.

en	Page (###uid###) does not exist.

en	Element '###title###' (###uid###) is not located on page ###wrongpage###, but on page ###rightpage###.

en	Element '###title###' (###uid###) is deleted.

en	Element '###title###' (###uid###) is not visible.

en	Element (###uid###) does not exist.

en	###title### row (###uid###) is not visible.

en	###title### row (###uid###) is deleted.

en	Linked

en	Row (###uid###) does not exist.

en	No information about the error is available.

en	External Link not reachable.

en	A redirect loop occurred. (%s: %s)

en	Too many redirects.

en	File doesn't exist.

en	Operation timeout. The specified time-out period was reached according to the conditions.

en	External link is broken.

en	Could not resolve host. The given remote host was not resolved.

en	Failure with receiving network data.

en	An error occurred (%s): "%s".

en	Exception: %s

en	Network error / invalid domain

en	Multiple Choices (300).

en	Use proxy (305).

en	Accessing this address is not allowed (403).

en	The requested url was not found (404).

en	Internal Server Error (500)

en	External Link returned HTTP error code (%s).

en	Unsupported protocol.

en	Initialization failed.

en	The URL was not properly formatted.

en	Feature not supported.

en	Couldn't resolve proxy.

en	Couldn't resolve host.

en	Failed to connect to host or proxy.

en	The remote server sent data that could not be parsed.

en	Access denied.

en	Generic HTTP/2 error.

en	A file transfer was shorter or larger than expected.

en	Timeout: The remote server possibly took too long to answer.

en	Problem with SSl / TLS handshake.

en	Too many redirects.

en	General network error. Send failed.

en	General network error. Receive failed.

en	The remote server's SSL certificate was deemed not OK.

en	Maximum file size exceeded.

en	Ok

en	%1$s %2$s

en	No broken links to show!

en	There are no broken links to be displayed.

en	No access!

en	You do not have access to these listings.

en	Checking links, please stand by.

en	Refreshing link list, please stand by.

en	Needs recheck